Lev. Ampl. 1/A dB 99 1.00000 1.00 0.000 98 0.92786 1.08 -0.650 97 0.91795 1.09 -0.744 96 0.85132 1.17 -1.398 95 0.84251 1.19 -1.488 94 0.78139 1.28 -2.143 93 0.77313 1.29 -2.235 92 0.71696 1.39 -2.890 91 0.70925 1.41 -2.984 90 0.65804 1.52 -3.635 89 0.65088 1.54 -3.730 88 0.60352 1.66 -4.386 87 0.59747 1.67 -4.474 86 0.55396 1.81 -5.130 85 0.54791 1.83 -5.226 84 0.50826 1.97 -5.878 83 0.50275 1.99 -5.973 82 0.46586 2.15 -6.635 81 0.46090 2.17 -6.728 80 0.42731 2.34 -7.385 79 0.42291 2.36 -7.475 78 0.39207 2.55 -8.133 77 0.38822 2.58 -8.219 76 0.35958 2.78 -8.884 75 0.35573 2.81 -8.978 74 0.32985 3.03 -9.634 73 0.32654 3.06 -9.721 72 0.30286 3.30 -10.375 71 0.29956 3.34 -10.470 70 0.27753 3.60 -11.134 69 0.27478 3.64 -11.220 68 0.25441 3.93 -11.889 67 0.25165 3.97 -11.984 66 0.23348 4.28 -12.635 65 0.23073 4.33 -12.738 64 0.21421 4.67 -13.383 63 0.21200 4.72 -13.473 62 0.19659 5.09 -14.129 61 0.19438 5.14 -14.227 60 0.18007 5.55 -14.891 59 0.17786 5.62 -14.998 58 0.16520 6.05 -15.640 57 0.16355 6.11 -15.727 56 0.15033 6.65 -16.459 55 0.13877 7.21 -17.154 54 0.13767 7.26 -17.224 53 0.12775 7.83 -17.873 52 0.12610 7.93 -17.986 51 0.11674 8.57 -18.656 50 0.11564 8.65 -18.738

Lev. Ampl. 1/A dB 49 0.10738 9.31 -19.382 48 0.10628 9.41 -19.471 47 0.09879 10.12 -20.106 46 0.09758 10.25 -20.213 45 0.09058 11.04 -20.859 44 0.08965 11.15 -20.949 43 0.08287 12.07 -21.632 42 0.08199 12.20 -21.724 41 0.07621 13.12 -22.360 40 0.07511 13.31 -22.486 39 0.06944 14.40 -23.168 38 0.06872 14.55 -23.258 37 0.06388 15.66 -23.893 36 0.06333 15.79 -23.968 35 0.05859 17.07 -24.643 34 0.05363 18.64 -25.411 33 0.05363 18.64 -25.411 32 0.05292 18.90 -25.528 31 0.04912 20.36 -26.175 30 0.04515 22.15 -26.906 29 0.04455 22.45 -27.023 28 0.04097 24.41 -27.751 27 0.03822 26.17 -28.355 26 0.03469 28.83 -29.196 25 0.03442 29.06 -29.265 24 0.03161 31.64 -30.004 23 0.02952 33.88 -30.599 22 0.02671 37.44 -31.467 21 0.02649 37.75 -31.539 20 0.02494 40.09 -32.060 19 0.02252 44.40 -32.948 18 0.02230 44.84 -33.033 17 0.02081 48.04 -33.632 16 0.01911 52.33 -34.376 15 0.01735 57.65 -35.216 14 0.01641 60.94 -35.698 13 0.01630 61.35 -35.756 12 0.01465 68.27 -36.685 11 0.01333 75.04 -37.506 10 0.01267 78.96 -37.948 9 0.01267 78.96 -37.948 8 0.01178 84.86 -38.574 7 0.01041 96.08 -39.653 6 0.00936 106.82 -40.573 5 0.00881 113.50 -41.100 4 0.00859 116.41 -41.320 3 0.00611 163.60 -44.276 2 0.00485 206.36 -46.293 1 0.00369 271.04 -48.661 0 0.00182 550.30 -54.812